0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

0.1 T anomaly, ^oC, (q_i=300MW, dx=100m, k=0.4)

X, km

Y, km

Current data source: Mofjeld+4

MJDay: 51757, hr: 4.5

5cm/s True North -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 -1

-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

0.6

0.8

1