0 50 100 Stn24 Δθ_2 depth bins

N mean=0.0618 median=0.0640 bin=2100+10

0 100 200

N mean=0.0550

median=0.0620 bin=2110+10

0 100 200

N mean=0.0494 median=0.0580 bin=2120+10

0 100 200

N mean=0.0452 median=0.0530 bin=2130+10

0 100 200

N mean=0.0383 median=0.0395 bin=2140+10

0 500 1000

N mean=0.0251 median=0.0170 bin=2150+10

0 50 100

N mean=0.0288 median=0.0290 bin=2160+10

0 100 200

N mean=0.0274 median=0.0270 bin=2170+10

0 100 200

N mean=0.0284 median=0.0275 bin=2180+10

-0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0 50 100

N mean=0.0261 median=0.0280 bin=2190+10

Δθ