35 #1 W (0.037) 35 #4 N (0.001)

35 #2 S (0.038)

Z [m]

-2050

-2000

-1950

-1900

-1850

35 #3 E (0.051)

36 #1 W (0.027) 37 #1 N (0.033)

36 #2 S (0.001)

-2050

-2000

-1950

-1900

-1850

36 #3 E (0.031)

37 #2 W (0.055)

37 #3 S (0.037)

-2050

-2000

-1950

-1900

-1850

37 #4 E (0.031)

38 #1 N (0.006)

38 #2 W (0.052)

38 #3 S (0.049)

-2050

-2000

-1950

-1900

-1850

38 #4 E (0.050)

39 #1 N (0.049)

L [m]

0 100 200 300

39 #2 W (0.058)

L [m]

0 500

39 #3 S (0.040)

L [m]

-300 -200 -100 0

-2050

-2000

-1950

-1900

-1850

39 #4 E (0.053)

L [m]

-500 0