Regional dtheta [oC], avg-I10c, 0 to 100 mob

129˚ 08' 129˚ 06' 129˚ 04' 129˚ 02'

47˚ 54'

47˚ 56'

47˚ 58'

48˚ 00'

48˚ 02'

2100

2100

2100

2200

2200

2200

2200

2200

2200

2300

2300

2300

2300

2300

2400

-0.0500

0.0000

0.0025

0.0050

0.0075

0.0100

0.0150

0.0200

0.0250

0.0300

0.0335

0.0375

0.0400

0.0435

0.0475

0.0500

0.0550

0.0600

0.0650

0.0700

0.1000

0.1300

0.3000

Salty Dawg High Rise

Main Endeavour

Mothra