1850

1900

1950

2000

2050

2100

2150

Depth [m]

3.0 3.1 3.2 3.3 3.4 3.5 3.6 3.7 3.8 3.9 4.0 4.1 4.2 4.3 4.4 4.5 θ_2 [˚C]

3.73.83.94.04.14.24.34.44.5 θ_2 [˚C]

35.00 35.05 Salinity [psu]