3.73.83.94.04.14.24.34.44.54.64.74.84.9 θ_2 [˚C]

35.00 35.02 35.04 35.06 35.08 35.10 Salinity [psu]

36.8

36.85

36.9

36.95

FLAME (Individual Profile) FLAME-2 (Individual Profile) E Background (FLAME) E Background (FLAME-2)