3456789101112 θ_2 [˚C]

34.9 35.0 35.1 35.2 35.3 35.4 35.5 Salinity [psu]

3637

FLAME (Mean Profile) FLAME-2 (Mean Profile) W Background (FLAME) E Background (FLAME-2)