1700

1800

1900

2000

2100

2200

2300

2400

2500

2600

2700

Depth [m]

2 4 6 8 10 12 14 16 18 20 22 24 26 28 30 32 34 Along-Track Distance [km]

Rainbow Ridge NE Basin