2000

2050

2100

2150

2200

2250

2300

2350

2400

2450

2500

2550

2600

2650

2700

Depth [m]

-0.05 -0.04 -0.03 -0.02 -0.01 -0.00 0.01 0.02 0.03 0.04 0.05 Δ_ρT [˚C]

(c)

Particle Anomalies Δ_ρT “bilinear” Δ_ρT “extrapolated”