36.90

36.91

36.92

36.93

36.94

36.95 σ_2 [kg/m^3]

3.4 3.5 3.6 3.7 3.8 3.9 4.0 4.1 4.2 θ_2 [˚C]

0.0 0.5 1.0 1.5 2.0 2.5 3.0

Nephels [V]

(a)

Nephels Temperature