1850

1900

1950

2000

2050

2100

2150

Depth [m]

36.90 36.95 37.00 σ_2 [kg/m^3]

0.00 0.05 0.10

Nephels [V]

Nephels Potential Density

3.73.83.94.04.14.24.34.44.5 θ_2 [˚C]

35.00 35.05 Salinity [psu]