-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0

100

200

300

400

500

600

700

800

E/W current velocity [m/s]

Number of measurements in 0.01 m/s bin

Histogram of E/W currents 300 m above bottom

mean v = -0.0176 +1std = 0.1130 -1std = -0.1482 +2std = 0.24 -2std = -0.27

% within 2std: 93.6

min v = -0.555 max v = 0.621