10^{-1} 10^0 10^1

10^{-10}

10^{-9}

10^{-8}

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

f bin width=0.0046cpd

D f SD

frequency, cpd power, (cm/s) 2/cpd

Wasp2161U detrended spectrum