492350 492400 492450 492500 492550 492600 492650 492700 492750 492800

5310000

5310050

5310100

5310150

5310200

5310250

5310300

5310350

Quebec Δθ: Stn20, 21, and 25

UTM X

UTM Y

>0.11 >0.07 >0.02 <0.02

---- Quebec Boundary

South end of MEF track Δθ<0.02^oC