0 100 200 300 400 500 600 700 800 900 1000

-2110

-2105

-2100

-2095 depth, m

ABE50 depth andΔθ above Grotto/Dante

0 100 200 300 400 500 600 700 800 900 1000 0 0.2 0.4 0.6

Δθ,oC

Dante

Sully/Tara mid-field

0 100 200 300 400 500 600 700 800 900 1000

4500

5000

5500

6000

6500

X,Y, m

Y

X Approximate distance (along ABE track), m