-0.02 0 0.02 0.04 0.06 0.08 0.1

-2200

-2150

-2100

-2050

-2000

-1950

-1900

-1850

-1800

Δ^Sθ [_oC] depth [m]

5m depth bin mean of all NoMEF and SoMEF CTDΔ^Sθ data

SoMEF: 4,6,7,33

NoMEF: 3,5,14,28