34.55 34.56 34.57 34.58 34.59 34.6 34.61 34.62 34.63

-2300

-2250

-2200

-2150

-2100

-2050

-2000

-1950

-1900

-1850

-1800

-1750

Salinity, sensor 2 depth, [m]

S to N comparison of salinity profiles bkground 1

16 SEflank

23 SEflank

34 SW Mothra

27 Mothra

24 SE-SoMEF

Deep S avg