34.54 34.56 34.58 34.6 34.62 1.6

1.65

1.7

1.75

1.8

1.85

1.9

1.95

2

2.05

2.1

Salinity, psu θ,oC

27.6

27.62 27.64

27.64

27.66

27.66

27.68 27.7

27.6 27.62 27.64 27.66 27.68 27.7

-2300

-2200

-2100

-2000

-1900

-1800

-1700 σ^θ, kg/m_3+1000 depth, m nosomef

Avg bkg