0 200 400 Stn34 Δθ_2 depth bins

N mean=0.0216 median=0.0190 bin=2100+10

0 200 400

N mean=0.0238

median=0.0240 bin=2110+10

0 200 400

N mean=0.0182 median=0.0170 bin=2120+10

0 500 1000

N mean=0.0141 median=0.0120 bin=2130+10

0 200 400

N mean=0.0114 median=0.0090 bin=2140+10

0 500

N mean=0.0108 median=0.0090 bin=2150+10

0 500

N mean=0.0117 median=0.0100 bin=2160+10

0 500

N mean=0.0115 median=0.0100 bin=2170+10

0 500

N mean=0.0122 median=0.0110 bin=2180+10

-0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0 500 1000

N mean=0.0143 median=0.0140 bin=2190+10

Δθ