3 5 14 28

Time series ofΔθ N and S of MEF

Depth [m]

0 2 4 6 8 10 12 14 16

1800 1900 2000 2100 2200 0 0.02 0.04 0.06 0.08 0.1

4 6 7 33 Cumulative time on station [hr] oC

0 2 4 6 8 10 12 14 16 18

1800 1900 2000 2100 2200