0 2 4 6 8 10 12 14 16

-1000

-500

0

500

1000

1500

2000

Net heat flux, MW

Set of sequential surfaces, n:n+3

Mean H_{qs}= 378 MW Quasi-synoptic estimates: H_{qs}