~500m south of MEF

0.024

1825m

0.064

1850m

0.142

1875m

0.182

1900m

0.198

1925m

0.243

1950m

0.264

1975m

0.282

2000m

0.284

2025m

0.276

2050m

0.201

2075m

0.128

2100m

0.089

2125m

0.083

2150m

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0.094

2175m

Backscatter, CTD4,6,7,12,13,33