Stn10 N #1 (0.117)

Stn10 N #2 (0.133)

Stn10 N #3 (0.148)

X [m]

0 100 200 300

Stn12 S #1 (0.209)

Z [m]

-2200

-2100

-2000

-1900

-1800

Stn12 S #2 (0.218)

-2200

-2100

-2000

-1900

-1800

Stn12 S #3 (0.194)

X [m]

0 100 200 300

-2200

-2100

-2000

-1900

-1800

Stn12 S #4 (0.253)

Stn13 S #1 (0.277)

X [m]

0 100 200 300

Stn12 S #5 (0.274)

BKS 0 0.2 0.4 0.6